General Behavior
This is a module to configure general workspace behavior.
Display informational tooltips on mouse hover 	 If this option is checked, tooltips are displayed hovering items in the panel or on the desktop.
Display visual feedback for status changes 	 If you change ⪚ brightness and volume using the keyboard these status changes are displayed in an OSD.
Animation speed 	 Allows you to set the speed of desktop effect animations from Slow to Instant.
Single-click to open files and folders 	 This is the default setting. Clicking once on an icon will open it. To select you can drag around the icon(s) or Right click, or simply click and hold to drag it. Selection can also be done by clicking on item's selection marker.
Double-click to open files and folders 	 If this option is not checked, icons/files will be opened with a single click of the left mouse-button. This default behavior is consistent with what you would expect when you click links in most web browsers. If checked however, icons/files will be opened with a double click, while a single click will only select the icon or file. This is the behavior you may know from other desktops or operating systems.
Clicking in scrollbar track Scrolls one page up and down 	 This is the default setting. Left-click in scrollbar track moves scrollbar by one page.
Clicking in scrollbar track Scrolls to the clicked location 	 Turns on the behavior when the scroll handle position jumps right to the position in the document where you have clicked. This is the behavior you may know from other desktops or operating systems.
Touch Mode Automatically enable as needed/Never enabled 	 Touch Mode will be automatically activated whenever the system detects a touchscreen but no mouse or touchpad. For example: when a transformable laptop's keyboard is flipped around or detached.
Always enabled (default)/Never enabled 	 In Touch Mode, many elements of the user interface will become larger to more easily accommodate touch interaction.